% Created 2024-03-19 Tue 11:13
% Intended LaTeX compiler: pdflatex
\documentclass[a4paper, 10pt, DIV=12, parskip=full, bibliography=totoc]{scrreprt}

\input{preamble.tex}
\bibliography{nass-design.bib}
\author{Dehaeze Thomas}
\date{\today}
\title{Nano Hexapod - Obtained Design}
\hypersetup{
 pdfauthor={Dehaeze Thomas},
 pdftitle={Nano Hexapod - Obtained Design},
 pdfkeywords={},
 pdfsubject={},
 pdfcreator={Emacs 29.2 (Org mode 9.7)}, 
 pdflang={English}}
\usepackage{biblatex}

\begin{document}

\maketitle
\tableofcontents

\clearpage
Presentation of the obtained design:
\begin{itemize}
\item Fixation
\item Cable management
\item Plates design
\item FEM results
\item Table some pictures from here: \href{file:///home/thomas/Cloud/work-projects/ID31-NASS/matlab/nass-nano-hexapod-assembly/nass-nano-hexapod-assembly.org}{nass-nano-hexapod-assembly}
\item Explain again the different specifications in terms of space, payload, etc..
\item CAD view of the nano-hexapod
\item Chosen geometry, materials, ease of mounting, cabling, \ldots{}
\item Validation on Simscape with accurate model?
\end{itemize}

\begin{table}[htbp]
\caption{\label{tab:nass_design_section_matlab_code}Report sections and corresponding Matlab files}
\centering
\begin{tabularx}{0.6\linewidth}{lX}
\toprule
\textbf{Sections} & \textbf{Matlab File}\\
\midrule
Section \ref{sec:nass_design}\_ & \texttt{nass\_design\_1\_.m}\\
\bottomrule
\end{tabularx}
\end{table}
\chapter{Amplified Piezoelectric Design}
\label{sec:nass_design_mechanics}
\chapter{Conclusion}
\label{sec:nass_design_conclusion}
\printbibliography[heading=bibintoc,title={Bibliography}]
\end{document}
