\documentclass[%
    a0paper,%
    20pt,%
    portait,%
    margin=0mm,%
    innermargin=10mm,%
    blockverticalspace=10mm,%
    colspace=10mm,%
    subcolspace=5mm%
]{tikzposter}

\input{config.tex}

\addbibresource{ref.bib}

\author{T. Dehaeze, M. Magnin-Mattenet, C. Collette}
\date{2018-09-06}
\title{Sample Stabilization for Tomography Experiments in Presence of Large Plant Uncertainty}
\institute{}

\useblockstyle{customstyle}

\begin{document}

\maketitle[%
    roundedcorners=2,
    linewidth=2mm,
    innersep=10mm,
    titletotopverticalspace=10mm,
    titletoblockverticalspace=10mm]

\block[]{}{\input{abstract.tex}}

\begin{columns}
\column{0.5}
\block[]{Introduction}{\input{introduction.tex}}
\block[]{ID31 Sample Station}{\input{id31samplestation.tex}}

\column{0.5}
\block[]{Nano Active Stabilization System}{\input{nass.tex}}
\block[]{Results}{\input{results.tex}}
\block[]{Conclusion}{\input{conclusion.tex}}
\end{columns}

\block[]{}{\input{reference.tex}}
% \block[]{}{\input{acknoledgment.tex}}

\end{document}
\section{ACKNOWLEDGMENTS}
\label{sec:org59f58a9}
This research was made possible by a grant from the ESRF.
We thank the following people for their support, without whose help this work would never have been possible: V. Honkimaki, A. Jublan, L. Ducotte, C. Carole, M. Brendike and M. Lessourd and the whole team of the Precision Mechatronic Laboratory.